SP mode: SP-157 Beam: 7286MeV/c Decay: ppbar_JpsiOmega_JpsiToEE_OmegaTopi+pi-pi0.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0 200 400 600 800 1000

1200

1400

1600

1800

2000

SP mode: SP-161 Beam: 3000MeV/c Decay: ppbar_LambdaLambdabar_PHSP.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0 500 1000

1500

2000

2500

3000

SP mode: SP-134 Beam: 6573MeV/c Decay: ppbar_D+D-_DtoKPiPi.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0 500 1000

1500

2000

2500

3000

3500

4000

4500

SP mode: SP-115 Beam: 8805MeV/c Decay: ppbar_DsDs0st_Ds0stToDspi0_DsTophipi.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0 1000

2000

3000

4000

5000

6000

7000

8000

SP mode: SP-155 Beam: 5550MeV/c Decay: ppbar_Jpsigamma_JpsiToEE.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0 100 200 300 400 500 600 700 800

SP mode: SP-171 Beam: 10000MeV/c Decay: ppbar_e+e-.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0

500

1000

1500

2000

2500

SP mode: SP-117 Beam: 8893MeV/c Decay: ppbar_DsDs0st_Ds0stToDspi0_DsTophipi.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0 1000

2000

3000

4000

5000

6000

7000

8000

SP mode: SP-113 Beam: 4000MeV/c Decay: ppbar_Xi+Xi-_XiToLambdaPi_LambdaToppi.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0

1000

2000

3000

4000

5000

SP mode: SP-158 Beam: 7286MeV/c Decay: ppbar_JpsiOmega_JpsiToMuMu_OmegaTopi+pi-pi0.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0 200 400 600 800 1000

1200

1400

1600

1800

2000

SP mode: SP-137 Beam: 15000MeV/c Decay: ppbar_LambdaLambdabar_PHSP.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0 1000

2000

3000

4000

5000

6000

7000

SP mode: SP-164 Beam: 15000MeV/c Decay: ppbar_CCbarHybrEta_D0Dst0Eta_Dst0ToD0pi0_D0ToKpipi0_EtaToGG.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0 500 1000

1500

2000

2500

3000

SP mode: SP-154 Beam: 6985MeV/c Decay: ppbar_Jpsigamma_JpsiToEE.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0 100 200 300 400 500 600

SP mode: SP-112 Beam: 4000MeV/c Decay: ppbar_Xi0Xi0bar_XiToLambdaPi0_LambdaToppi.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0

500

1000

1500

2000

2500

SP mode: SP-149 Beam: 8957MeV/c Decay: ppbar_Psi2Spi+pi-_Psi2SToJpsipi+pi-_JpsiToEE.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0

1000

2000

3000

4000

5000

SP mode: SP-150 Beam: 8681MeV/c Decay: ppbar_JpsiPi+Pi-_Psi2SModel.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0 200 400 600 800 1000

1200

1400

1600

1800

2000

SP mode: SP-146 Beam: 8681MeV/c Decay: ppbar_Jpsipi+pi-_JpsiToEE.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0 200 400 600 800 1000

1200

1400

1600

1800

2000

SP mode: SP-160 Beam: 1640MeV/c Decay: ppbar_LambdaLambdaBar_Polarized.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0

500

1000

1500

2000

2500

SP mode: SP-148 Beam: 8681MeV/c Decay: ppbar_JpsiEta_JpsiToEE.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0

100

200

300

400

500

SP mode: SP-162 Beam: 5609MeV/c Decay: ppbar_hc_etacgamma_KsKPigamma.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0 200 400 600 800 1000

1200

1400

1600

1800

SP mode: SP-144 Beam: 8681MeV/c Decay: ppbar_Jpsipi0pi0_JpsiToEE.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0 100 200 300 400 500 600 700

SP mode: SP-169 Beam: 3675MeV/c Decay: DpmEvtGen.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0 200 400 600 800 1000

1200

SP mode: SP-114 Beam: 8801MeV/c Decay: ppbar_DsDs0st_Ds0stToDspi0_DsTophipi.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0 1000

2000

3000

4000

5000

6000

7000

8000

SP mode: SP-111 Beam: 1640MeV/c Decay: ppbar_LambdaLambdabar_PHSP.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0

500

1000

1500

2000

2500

SP mode: SP-116 Beam: 8810MeV/c Decay: ppbar_DsDs0st_Ds0stToDspi0_DsTophipi.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0 1000

2000

3000

4000

5000

6000

7000

8000

SP mode: SP-170 Beam: 15000MeV/c Decay: DpmEvtGen.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0 500 1000

1500

2000

2500

3000

3500

4000

SP mode: SP-139 Beam: 15000MeV/c Decay: ppbar_Xi+Xi-_XiToLambdaPi_LambdaToppi.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0 2000

4000

6000

8000

10000

12000

SP mode: SP-172 Beam: 10000MeV/c Decay: ppbar_pi+pi-.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0

500

1000

1500

2000

2500

SP mode: SP-135 Beam: 7698MeV/c Decay: ppbar_Dst+Dst-_DstToD0pi_D0toKPi.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0 1000

2000

3000

4000

5000

6000

SP mode: SP-145 Beam: 8681MeV/c Decay: ppbar_JPsipi0pi0_JPsiToEE_Psi2Slike.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0 100 200 300 400 500 600 700

SP mode: SP-128 Beam: 15000MeV/c Decay: ppbar_CCbarHybrEta_Chic1Pi0Pi0Eta.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0 100 200 300 400 500 600 700 800

SP mode: SP-138 Beam: 15000MeV/c Decay: ppbar_Xi0Xi0bar_XiToLambdaPi0_LambdaToppi.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0 1000

2000

3000

4000

5000

6000

SP mode: SP-159 Beam: 8681MeV/c Decay: ppbar_JpsiEta_JpsiToMuMu.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0

100

200

300

400

500

SP mode: SP-123 Beam: 2200MeV/c Decay: ppbar_phiphi_phiToK+K-_phiToKl0Ks0.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0 500 1000

1500

2000

2500

3000

SP mode: SP-110 Beam: 1640MeV/c Decay: ppbar_LambdaLambdabar.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

SP mode: SP-120 Beam: 2200MeV/c Decay: ppbar_phiphi_phiToK+K-.dec

) [deg] 2 , trk 1 (trk α 0 20 40 60 80 100 120 140 160 180 0

500

1000

1500

2000

2500